TABLE B1 Observed Energy Distribution: Q0003+158

log(ν_{0})  log(ν_{1})  log(ν_{2})  log(νF (ν))  Date  Aperture  Filter or  Instrument  Reference
(Hz)  (Hz)  (Hz)  (Jy Hz)  (arcsec)  Detector  (or Telescope)  (see notes)
9.70  9.70  9.70  8.81_{−0.00}^{+0.00}  1983 Nov  18.0  -  VLA  AJ098,1195
12.48  12.40  12.56  < 11.84  1983  300.0  IRAS4  IRAS(AO)  Table11
12.70  12.57  12.87  < 11.54  1983  300.0  IRAS3  IRAS(AO)  Table11
13.08  13.00  13.20  < 11.98  1983  300.0  IRAS2  IRAS(AO)  Table11
13.40  13.30  13.55  < 12.00  1983  300.0  IRAS1  IRAS(AO)  Table11
13.93  13.88  14.00  11.47_{−0.08}^{+0.08}  1988 Jan 31  5.0  L  MMT  Table9
14.13  14.11  14.19  11.47_{−0.02}^{+0.02}  1984 Sep 14  5.0  K  MMT  Table9
14.13  14.11  14.19  11.51_{−0.02}^{+0.02}  1988 Jan 31  5.0  K  MMT  Table9
14.13  14.11  14.19  11.58_{−0.02}^{+0.02}  1980 Oct 19  5.0  K  Hale  ApJS63,615
14.26  14.23  14.31  11.56_{−0.02}^{+0.02}  1984 Sep 14  5.0  H  MMT  Table9
14.26  14.23  14.31  11.60_{−0.02}^{+0.02}  1988 Jan 31  5.0  H  MMT  Table9
14.26  14.23  14.31  11.68_{−0.02}^{+0.02}  1980 Oct 19  5.0  H  Hale  ApJS63,615
14.38  14.35  14.45  11.64_{−0.02}^{+0.02}  1984 Sep 14  5.0  J  MMT  Table9
14.38  14.35  14.45  11.70_{−0.02}^{+0.02}  1988 Jan 31  5.0  J  MMT  Table9
14.38  14.35  14.45  11.77_{−0.03}^{+0.03}  1980 Oct 19  5.0  J  Hale  ApJS63,615
14.57  14.56  14.58  11.87_{−0.01}^{+0.01}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.58  14.58  14.59  11.86_{−0.01}^{+0.01}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.60  14.59  14.61  11.89_{−0.01}^{+0.01}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.66  14.66  14.67  11.94_{−0.00}^{+0.00}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.74  14.73  14.74  12.05_{−0.01}^{+0.01}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.76  14.75  14.77  12.11_{−0.00}^{+0.00}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.80  14.80  14.81  12.13_{−0.00}^{+0.00}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.82  14.81  14.82  12.13_{−0.00}^{+0.00}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.83  14.82  14.84  12.12_{−0.00}^{+0.00}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.85  14.84  14.85  12.13_{−0.02}^{+0.02}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.89  14.88  14.89  12.13_{−0.00}^{+0.00}  1980 Nov 14  15.0  AB  Hale  ApJS63,615
14.97  14.96  14.98  12.29_{−0.07}^{+0.06}  1982 Oct 21  15.0  -  LWR14452  RDAF
14.99  14.98  15.00  12.12_{−0.03}^{+0.03}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.01  15.00  15.03  12.09_{−0.03}^{+0.03}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.05  15.05  15.06  12.04_{−0.03}^{+0.03}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.07  15.06  15.07  12.07_{−0.04}^{+0.03}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.08  15.07  15.09  12.05_{−0.04}^{+0.03}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.09  15.09  15.10  12.16_{−0.04}^{+0.03}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.10  15.10  15.11  12.04_{−0.05}^{+0.05}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.15  15.14  15.15  12.22_{−0.04}^{+0.04}  1982 Oct 21  15.0  -  LWR14452  RDAF
15.19  15.18  15.19  12.08_{−0.03}^{+0.03}  1982 Oct 20  15.0  -  SWP18342  RDAF
15.20  15.19  15.21  12.12_{−0.02}^{+0.02}  1982 Oct 20  15.0  -  SWP18342  RDAF
15.26  15.25  15.27  12.06_{−0.03}^{+0.03}  1982 Oct 20  15.0  -  SWP18342  RDAF
15.28  15.27  15.29  12.14_{−0.03}^{+0.02}  1982 Oct 20  15.0  -  SWP18342  RDAF
15.33  15.32  15.34  12.03_{−0.03}^{+0.02}  1982 Oct 20  15.0  -  SWP18342  RDAF
15.35  15.34  15.36  12.03_{−0.02}^{+0.02}  1982 Oct 20  15.0  -  SWP18342  RDAF
15.37  15.36  15.39  12.06_{−0.03}^{+0.02}  1982 Oct 20  15.0  -  SWP18342  RDAF
17.38  16.68  17.93  11.53_{−0.24}^{+0.72}  1980  360.0  IPC  IPC  Table3
17.99  17.68  18.38  < 12.16  1977 Dec 29  -  HEAO  HEAO/A2  ApJS72,471