CONT: NGC6251 RR 1386.919 MHZ NGC6251.PBCOR.4

PLot file version 1 created 26-JUN-2003 15:55:42

Cont peak flux = 4.7082E-01 JY/BEAM Levs = 3.000E-04 * (-1, 1, 1.414, 2, 2.828, 4, 5.657, 8, 11.31, 16, 22.63, 32, 45.25, 64, 90.51, 128, 181.0, 256, 362.0, 512, 724.1, 1020, 1450, 2050, 2900)

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

16 36 35 34 33 32 31 30 29

82 40

38

36

34

32

30

28

26

24