TABLE 3 Evolution Regressions for LBQS Emission Lines

Emission line All Data (including upper limits) Detections only NAME TOT UPP C/K/S^a Slope Intercept NUM C/K/S Slope Intercept

Full LBQS Fe UV 953 294 0.00/0.00/0.00 -1.312±0.101 1.13±0.03 659 0.00/0.00/0.00 -0.190±0.038 1.52±0.01 Lyα 259 0 0.00/0.00/0.00 -1.199±0.227 2.19±0.08 259 0.00/0.00/0.00 -1.216±0.226 2.20±0.08 Si IV + O IV] 414 19 0.00/0.00/0.00 -1.045±0.153 1.29±0.05 395 0.00/0.00/0.00 -1.163±0.149 1.35±0.05 C IV 487 1 0.00/0.00/0.00 -0.480±0.063 1.69±0.02 486 0.00/0.00/0.00 -0.481±0.107 1.69±0.03 Al III 667 181 0.00/0.00/0.00 -0.788±0.185 0.75±0.03 486 0.06/0.03/0.04 -0.202±0.092 0.87±0.02 C III] 667 26 0.00/0.01/0.01 -0.255±0.078 1.41±0.01 641 0.60/0.24/0.26 -0.045±0.069 1.40±0.01 Mg II 677 42 0.00/0.00/0.00 -0.390±0.044 1.49±0.02 635 0.00/0.00/0.00 -0.230±0.055 1.54±0.01 Hβ 146 16 0.00/0.00/0.00 -0.834±0.228 1.26±0.13 130 0.05/0.02/0.02 -0.561±0.171 1.45±0.09

LBQS bright Fe UV 777 233 0.00/0.00/0.00 -1.283±0.079 1.12±0.02 544 0.00/0.00/0.00 -0.178±0.036 1.52±0.01 Lyα 198 0 0.00/0.00/0.00 -1.071±0.270 2.14±0.09 198 0.00/0.00/0.00 -1.071±0.270 2.14±0.09 Si IV 323 14 0.00/0.00/0.00 -0.902±0.178 1.26±0.05 309 0.00/0.00/0.00 -1.102±0.122 1.34±0.03 CIV 383 1 0.00/0.00/0.00 -0.492±0.136 1.68±0.04 382 0.00/0.00/0.00 -0.488±0.103 1.68±0.03 Al III 529 134 0.00/0.00/0.00 -0.689±0.140 0.76±0.03 395 0.05/0.05/0.06 -0.206±0.091 0.86±0.02 Mg II 562 33 0.00/0.00/0.00 -0.396±0.051 1.48±0.01 529 0.00/0.00/0.00 -0.248±0.058 1.53±0.01 Hβ 124 12 0.00/0.00/0.00 -0.976±0.327 1.17±0.19 112 0.05/0.02/0.01 -0.571±0.238 1.44±0.13

aCorrelation probabilities from ASURV for (C) Cox proportional Hazard model, (K) generalized Kendall‘s tau, and (S) Spearman‘s rho. NOTE.—Schmitt 2-D Kaplan-Meier regression fits and errors from ASURV. The relations examined here are log W_λ(line) ∝ log z. Correlation probabilities in boldface meet our most stringent significance criteria: P < 1% in all 3 correlation tests using all data, and an upper limit fraction < 33%.