TABLE 1 Baldwin Effect Regressions for the LBQS

Emission line All Data (including upper limits) Detections only Line Name N_{T ot} N_{Limits} C/K/S^a Slope Intercept N C/K/S^a Slope Intercept

Fe II UV 953 294 0.00/0.00/0.00 -0.617 ±0.047 20.2 ± 1.4 659 0.00/0.00/0.00 -0.105 ± 0.016 4.8 ± 0.5 Fe II opt 248 110 0.00/0.00/0.00 -0.447 ± 0.108 14.5 ± 3.2 138 0.47/0.35/0.36 -0.007 ± 0.034 1.7 ± 1.0 Lβ λ1025.7 + O VI λ1035 130 27 0.98/0.19/0.22 0.112 ± 0.221 -2.9 ± 7.0 103 0.00/0.00/0.00 -0.500 ± 0.187 16.7 ± 5.9 Lα λ1215.7 259 0 0.00/0.00/0.00 -0.272 ± 0.067 10.3 ± 2.1 259 0.00/0.00/0.00 -0.272 ± 0.067 10.3 ± 2.1 N V λ1241.5 259 8 0.72/0.35/0.41 -0.037 ± 0.060 2.3 ± 1.9 251 0.01/0.08/0.09 -0.128 ± 0.068 5.2 ± 2.2 O I λ1305 259 120 0.10/0.15/0.04 -0.266 ± 0.121 8.5 ± 3.8 139 0.05/0.02/0.03 -0.307 ± 0.114 10.1 ± 3.6 Si IV + O IV] λ1400 414 19 0.00/0.00/0.00 -0.300 ± 0.080 10.3 ± 2.4 395 0.00/0.00/0.00 -0.308 ± 0.050 10.7 ± 1.6 C IV λ1549 487 1 0.00/0.00/0.00 -0.227± 0.025 8.7 ± 0.8 486 0.00/0.00/0.00 -0.231 ± 0.044 8.8 ± 1.4 He II λ1640 487 68 0.00/0.23/0.20 -0.166 ± 0.097 6.2 ± 3.0 419 0.59/0.38/0.37 0.058 ± 0.077 -0.7 ± 2.4 Al III λ1859 667 181 0.00/0.00/0.00 -0.229 ± 0.065 7.8 ± 2.0 486 0.07/0.09/0.10 -0.064 ± 0.054 2.8 ± 1.7 C III] λ1909 667 26 0.00/0.07/0.06 -0.120 ± 0.037 5.1 ± 1.1 641 0.55/0.56/0.57 -0.034 ± 0.032 2.4 ± 1.0 Mg II λ2800 677 42 0.00/0.00/0.00 -0.187 ± 0.017 7.3 ± 0.5 635 0.00/0.00/0.00 -0.126 ± 0.023 5.4 ± 0.7 [Ne V] λ3426 488 365 0.00/0.00/0.00 -0.288 ± 0.054 8.9 ± 1.6 123 0.04/0.34/0.33 0.079 ± 0.079 -1.7 ± 2.3 [O II] λ3728 393 272 0.00/0.00/0.00 -0.337 ± 0.036 10.4 ± 1.1 121 0.32/0.20/0.24 0.059 ± 0.064 -1.0 ± 1.9 [Ne III] λ3869 363 259 0.00/0.00/0.00 -0.464 ± 0.069 14.3 ± 2.1 104 0.09/0.06/0.06 0.126 ± 0.061 -3.0 ± 1.8 Hδ λ4101.7 309 222 0.00/0.00/0.00 -0.392 ± 0.085 12.0 ± 2.6 87 **/0.14/0.14 -0.150 ± 0.080 5.6 ± 2.3 Hγ λ4340.5 + [O III] λ4363 251 87 0.07/0.08/0.05 -0.146 ± 0.070 5.5 ± 2.1 164 0.46/0.57/0.57 -0.029 ± 0.047 2.0 ± 1.4 He II λ4686.5 186 154 0.00/0.00/0.00 -0.470 ± 0.091 14.5 ± 2.7 32 0.11/0.49/0.43 0.091 ± 0.217 -1.6 ± 6.4 Hβ λ4861.3 146 16 0.07/0.08/0.09 -0.214 ± 0.083 8.1 ± 2.5 130 0.92/0.20/0.25 -0.071 ± 0.074 3.9 ± 2.2 [O III] λ4959 146 71 0.02/0.18/0.05 -0.246 ± 0.098 8.1 ± 2.9 75 0.40/0.25/0.26 0.105 ± 0.129 -2.1 ± 3.8 [O III] λ5007 146 52 0.01/0.03/0.01 -0.300 ± 0.138 10.1 ± 4.1 94 0.73/0.70/0.76 0.087 ± 0.078 -1.3 ± 2.3 He I λ5875.6 33 30 0.77/0.92/0.98 0.052 ± 0.138 -0.7 ± 4.0 3 **/0.60/0.67 0.040 ± 0.380 0.0 ± 11.3

aCorrelation probabilities from ASURV for (C) Cox proportional Hazard model, (K) generalized Kendall‘s tau, and (S) Spearman‘s rho. NOTE.—Schmitt 2-D Kaplan-Meier regression fits and errors from ASURV. The Baldwin effect examined here is log L_{2500} ∝ log W_λ (line). Emission line names shown in boldface meet our most stringent significance criteria: P < 1% in all 3 correlation tests using all data, and an upper limit fraction < 33%. Correlation probabilities in boldface meet the former criterion for the data tested, regardless of limit fraction.